Figure 4: Typical skin friction line pattern and flow in leeward plane of symmetry near the hemisphere-cylinder junction.

(a) Ref. [26]

(b) Figure 5: Oil-flow visualization at M1 = 1.2, ReD = 650, 000, α = 0ffi.

(a) Ref. [26]

(b) Figure 6: Oil-flow visualization at M1 = 1.2, ReD = 650, 000, α = 5ffi.